<template>
<div>
    <div class="container-fluid mtb15">
        <div class="row">
            <div class="col-md-12">
                <!-- TradingView Widget BEGIN -->
                <div class="tradingview-widget-container">
                    <div class="tradingview-widget-container__widget"></div>
                    <iframe src="/static/Kline/heat-map.html" frameborder="0" width="100%" height="920"></iframe>
                </div>
                <!-- TradingView Widget END -->
            </div>
        </div>
    </div>
</div>
</template>

<script>
export default {
    
};
</script>

<style>
</style>
